Ph_p_i*180/3.1415

68.5 69 69.5 70 70.5

Ph_e_i*180/3.1415

-13.2 -13 -12.8

-12.6

-12.4

-12.2 -12 -11.8

Ph_e_i*180/3.1415:Ph_p_i*180/3.1415