Ph_p_i*180/3.1415

62.5 63 63.5 64 64.5 65

Ph_e_i*180/3.1415

-17.4

-17.2 -17 -16.8

-16.6

-16.4

-16.2 -16 -15.8

-15.6

Ph_e_i*180/3.1415:Ph_p_i*180/3.1415 {Numer_wt}