-Prec_ph*180/3.1415

-105 -100 -95 -90 -85 -80 -75 -70

-Prec

700 750 800 850 900 950 1000

1050

-Prec:-Prec_ph*180/3.1415 {Numer_wt}

-Prec_ph*180/3.1415

-105 -100 -95 -90 -85 -80 -75 -70

Pf_e_i

3450

3500

3550

3600

3650

3700

3750

Pf_e_i:-Prec_ph*180/3.1415 {Numer_wt}

-Prec_ph*180/3.1415

-105 -100 -95 -90 -85 -80 -75 -70

-Ph_e_i*180/3.1415

18 18.5 19 19.5 20 20.5 21 21.5 22 22.5

-Ph_e_i*180/3.1415:-Prec_ph*180/3.1415 {Numer_wt}

-Prec_ph*180/3.1415

-105 -100 -95 -90 -85 -80 -75 -70

Pf_p_i

1040

1060

1080

1100

1120

1140

Pf_p_i:-Prec_ph*180/3.1415 {Numer_wt}

-Prec_ph*180/3.1415

-105 -100 -95 -90 -85 -80 -75 -70

-Ph_p_i*180/3.1415

-22 -21.5 -21 -20.5 -20 -19.5 -19 -18.5 -18 -Ph_p_i*180/3.1415:-Prec_ph*180/3.1415 {Numer_wt}