E97-110 Shift Checklist

Name Date (mm/dd) Time (24 hr format) Latest Run Number Visual Hall Inspection OK ?

Beam Energy (GeV) BPMA (x,y) BPMB (x,y) Beam Current (uA) Charge Asymmetry (ppm) OTR @ 1C12 (in/out) OTR @ target (in/out) Fast Feedback Pos. Lock (on/off) Fast Feedback Energy Lock (on/off) Raster (on/off) Spot Diameter (x,y) Beam 1/2-wave plate (in/out) Latest Moller Measurement Latest Compton Measurement Target Type Holding Field Direction LEFT HRS Angle (deg.) LEFT HRS Collimator LEFT HRS Momentum (GeV) LEFT HRS Q1 (Amp) LEFT HRS Q2 (Amp) LEFT HRS Dipole (Amp) LEFT HRS Q3 (Amp) RIGHT HRS Angle (deg.) RIGHT HRS Collimator RIGHT HRS Momentum (GeV) RIGHT HRS Q1 (Amp) RIGHT HRS Q2 (Amp) RIGHT HRS Dipole (Amp) RIGHT HRS Q3 (Amp)

Continued on Second Page . . .

Cyro Levels? (He> 60%, N> 40%) Left Arm VDC 1, 2 HV Right Arm ADC 1, 2 HV Left Arm S1 HV ? Left Arm S2 HV ? Right Arm S1 HV ? Right Arm S2 HV ?

Left Arm Shower/Preshower? Right Arm Shower/Preshower?

Left Arm Gas Cherenkov? Right Arm Gas Cherenkov?

Latest Run Number Prescalers T1/T2 Rates T3/T4 Rates Septum Magnet Angle Septum Magnet Current Septum Magnet Momentum

2