Hall: A RADIATION BUDGET FORM page: 1 of 1

Exp. # E99-115 rev: C run dates: 2005 name of liaison: R. Michaels

setup number 1 1 beam energy GeV 3.270 totals: current uA(CW) 100.0 exp't element H target thickness mg/cm2 1420 cryo tgt element Al window thickness mg/cm2 203

run time hours 1008 1008 time (100% eff.) days 42.0 42.0 installation hours 0 time days 0.0 0.0 dose rate at method 1 urem/hr 2.19 the fence post method 2 urem/hr (run time) conservative urem/hr 2.19 dose per setup urem 2202 2202.5 % of annual dose budget % 22.0 22.025 % of allowed dose for the total time 191.41 % of allowed dose for the run time only 191.41 If > 200%, discuss result with Physics Research EH&S officer

date form issued: June 13, 2005 authors: P.Degtiarenko