DETAILS:

Below are the results from the superharp survey carried out on September 19^{th}, 2002. The values represent the difference in millimeters from the ideal position of each fiducial. A positive X value is to the beam left, a positive Y is too high.

Superharps

DX DY locations in mm (+ is beam left)

SH1H01A 0.28 0.18 SH1H01B 0.39 0.17 SH1H01C 0.36 0.17 SH1H02A -0.10 -0.03 SH1H02B -0.07 0.08 SH1H02C -0.05 0.05

Jefferson Lab Alignment Group

Data Transmittal

TO: R. Gilman, J. LeRose DATE: 3 October, 2002 FROM: C. J. Curtis Checked: # : A818