E06007 run sheet, kin01-kin11 Raster is always on for Pb and Bi and Sieve Slit is Out

DATE:

Energy = θ_L = P_{HRSL} = P_{HRSR} =

run target θ_R I 1H04A x/y 1H04B x/y raster start stop μA mm mm on/off hh:mm hh:mm

This file can be found at : http://hallaweb.jlab.org/experiment/E06-007/documentation.php