Time (ns)

115 120 125 130 135 140

S2m bar

0 2 4 6 8

10 12 14 16 ct_2451_0_L Entries 672131 Mean x 126.7 Mean y 7.537 RMS x 6.736 RMS y 3.221

0

200

400

600

800

1000 ct_2451_0_L

Coincidence Timing vs LHRS S2m bar - Run 2451 (k12) - no offsets, coincidence peak