ct_2451_2 Entries 671549 Mean 210 RMS 6.593

Time (ns)

195 200 205 210 215 220 225

2000

4000

6000

8000

10000

12000

14000

16000

Coincidence Timing - Run 2451 (k12) - pathlength correction and calibration offsets, coincidence peak