TDC Channel

1450 1460 1470 1480 1490 1500 1510 1520 1530 1540 1550

ADC Channel

560 580 600 620 640 660 680 700 720 740 ct_2451_adc_tdc_L7L

Entries 995949 Mean x 1499 Mean y 623.4 RMS x 7.083 RMS y 24.83

0 200 400 600 800 1000

1200

1400

1600

ADC/TDC Comparison - Run 2451 (k12) - LHRS bar 7, left PMT