ct_2451_dbb_t3t1_bg

Entries 940172 Mean -13.91 RMS 32.06

Time (ns)

-80 -60 -40 -20 0 20 40 60 0

5000

10000

15000

20000

25000

Coincidence Timing - Run 2451 (k12) - BB T3-T1, full background plateau