(deg) * pqθ 10 15 20 25 30 35 40 45 50 55

)^2

((GeV/c) 2Q

0.02

0.03

0.04

0.05

0.06

0.07 htemp Entries 24172 Mean x 34.64 Mean y 0.04615 RMS x 4.46 RMS y 0.006372

)^o

= 33 * pqθ, ^2

= 0.045 (GeV/c) 2 (W +/- 5 MeV) (Q * pqθ vs 2Q Q2_Theta_cut Entries 21502 Mean x 35.06 Mean y 0.0461 RMS x 3.524 RMS y 0.00609