(deg) * pqθ 10 15 20 25 30 35 40 45 50 55

W (MeV)

1190

1200

1210

1220

1230

1240

1250

1260 htemp Entries 55013 Mean x 34.42 Mean y 1221 RMS x 4.994 RMS y 7.191

)^o = 33 * pqθ, ^2

= 0.045 (GeV/c) 2 (Q * pqθ W vs _{W_Theta}

Entries 84103 Mean x 35.23 Mean y 1222 RMS x 5.697 RMS y 13.98