(deg) * pqθ 5 10 15 20 25 30 35 40 45 50 55

W (MeV)

1200

1210

1220

1230

1240

1250

1260

1270 htemp Entries 55087 Mean x 31.11 Mean y 1233 RMS x 4.694 RMS y 10.25

)^o = 30 * pqθ, ^2

= 0.125 (GeV/c) 2 (Q * pqθ W vs _{W_Theta}

Entries 69124 Mean x 31.87

RMS x 4.926 RMS y 15.68