kin raw raw match ωq-matched ωq-matched < σ > rate < σ > rate (pb/(^{MeV}_c )^2/sr^2) (Hz) (pb/(^{MeV}_c )^2/sr^2) (Hz) 1-2 2.0766 228.6000 3 7.8300 9.7908 3 0.3960 3.9542 3 0.3954 3.9322 4 0.4322 43.8100 6 0.9475 1.1074 5 0.2984 35.4900 6 0.7675 1.0132 6 0.0462 0.4555 6 0.0462 0.4538 7 0.0367 3.3969 9 0.0637 0.0678 7 0.0367 3.3969 31 0.0308 0.0252 8 0.0125 1.5044 9 0.0327 0.0444 9 0.0019 0.0179 9 0.0019 0.0178 10 0.0090 0.7778 12 0.0157 0.0155 10 0.0090 0.7778 32 0.0145 0.0113 11 0.0026 0.3124 12 0.0058 0.0078 11 0.0026 0.3124 31 0.0059 0.0060 12 0.0003 0.0032 12 0.0003 0.0032 13 0.0030 0.2450 15 0.0047 0.0044 14 0.0010 0.1135 15 0.0015 0.0020 14 0.0026 0.3124 32 0.0027 0.0027 15 0.0001 0.0009 15 0.0001 0.0009 16 15.2390 920.9800 17 68.3600 59.5806 17 4.1034 23.7800 17 4.1056 23.7436 18 0.4883 68.3760 19 1.2978 10.9483 19 0.1425 2.8600 19 0.1427 2.8581 20 0.0327 5.2773 21 0.0481 0.8740 21 0.0072 0.2121 21 0.0072 0.2121 22 0.3805 22.8250 23 0.6339 3.8133 23 0.0602 0.7675 23 0.0602 0.7664 24 0.0206 3.2380 25 0.0301 0.1517 25 0.0015 0.0203 25 0.0015 0.0201 26 0.0966 3.7853 27 0.1164 0.1211 27 0.0051 0.0281 27 0.0051 0.0281 28-29 0.0003 0.0242 - - - 30 0.1425 2.8600 30 0.1427 2.8581 31 0.0004 0.0038 31 0.0004 0.0038 32 0.0002 0.0016 32 0.0002 0.0016 33 1.3932 41.5500 3 1.7028 6.9400 34 0.2086 6.1134 6 0.2078 0.8294 35 0.1527 4.5853 6 0.1521 0.6242 36 15.1780 410.7700 17 30.7000 67.1833

Table 1:^3He(e, e^′p) continuum rates and cross sections estimated using the calculation of Kievsky et al. as incorporated by MCEEP.