æ

Experiment E95-001

Precise Measurement of A_T ′ in Quasielastic^3 ⃗He(⃗e, e^′) at low Q^2

and G^n_M

Spokespersons: H. Gao, J.-O. Hansen

• Measure the transverse asymmetry A_T ′ of^3 ⃗He(⃗e, e^′) at the quasielastic peak • Extract the neutron magnetic form factor G^n_M • Measure the spin-dependent asymmetry of^3 ⃗He(⃗e, e^′) in the threshold region

Figure 1: Neutron Magnetic Form Factor GnM W.Xu et al., Phys. Rev. Lett. 85, 2900 (2000)

• Ph.D Student: F.Xiong, W.Xu