æ

Experiment E99-117

Precision Measurement of the Neutron Asymmetry A^n_1 at Large x Using CEBAF at 6 GeV

Spokespeople: Z.-E.Meziani, J.P.Chen, P.Souder

• First precice data on A^n_1 at high Bjorken x. (0.3 < x < 0.6) • Try to distinguish between PQCD and hyperfine perturbed quark model descriptions of

the quark wave functions

• Test our fundamental understanding of valence quark picture

• Ph.D Student: X.Zheng