A Status Report of E00-007 Recoil Proton Polarization in d(γ, ⃗p)n Reaction

Xiaodong Jiang Rutgers University

December. 11, 2003 @ Hall A meeting

• The experiment. • Status of analysis.

Summary:

• Data analysis of E00-007 was stopped for a few months.

• Analysis has been re-started, Dr. Xiaodong Jiang takes over the responsibility. • The first time Hall A switch to the G0 helicity scheme. Not 100% sure about the

helicity recorded in the data stream. This might screw up Cx, Cz analysis, and

ep elastic calibration data. • E00-107 is off the book.