Beam Wave Plate

Asym

-0.4

-0.3

-0.2

-0.1 -0 0.1 0.2 0.3 0.4 -3 x10 left arm right arm 85 ppm ± Asym: 102

In Out

E97103 preliminary: false asymmetry