- Single GEANT - Coinc. GEANT

0.754

0.756

0.758

0.76

0.762

0.764

0.766

0.768

0.77

-0.6 -0.4 -0.2 0 0.2 0.4 0.6 0.8 1

5 5.5 6 6.5 7 7.5 8 8.5

-0.6 -0.4 -0.2 0 0.2 0.4 0.6 0.8 1