Entries 8914762 Mean 3.165e+04 RMS 3.053e+04 Underflow 16 Overflow 4989 / ndf

2χ 5.883e+08 / 4998 Constant 0.000±

9.549 Slope 1.07e-08 ± -3.15e-05

time interval, ns

0 50 100 150 200 250 310 × counts

0 2000

4000

6000

8000

10000

12000

14000

±

#1371 Trigger Time Distribution