Analysis Meeting January 06, 2005

Window Thickness for Exodus

• Measurements completed in December.

• Systematic uncertainty primarily due to incident angle. Window Thickness (μm) Stat. Syst.

Upstream 1 99.75 0.026 1.58 Upstream 2 100.80 0.041 1.34 Downstream 1 126.85 0.064 1.66 Downstream 2 127.7 0.092 1.34 Database Prescription

• Tested module for entire 2.134 GeV momentum range.

– Module appears to work correctly. – Need to check at other energies.

• Discovered an enhanced peak in θ_{tg} spectrum.

– Traced to cluster of events outside main distribution in the focal plane.

– Enhanced peak is not seen in optics data. – Checking VDCS, and target position dependencies.

To Do:

• Finish testing database module. • Find cause of enhanced peak in θ_{tg}.

1

2