napspec Entries 2611 Mean 1.665 RMS 0.2092

Momentum from ToF (m=0.938) - Elastics

0 0.5 1 1.5 2 2.5 3 3.5 0

50

100

150

200

250

Proton Momentum

Black - Full Red - Veto Signal Blue - No Veto Signal