napspec Entries 15070 Mean 1.243 RMS 0.6486

Momentum from ToF (m=0.938 GeV) (GeV/c)

0 0.5 1 1.5 2 2.5 3 3.5 0

100

200

300

400

500

Proton Momentum

Black - Full Red - Veto Signal Blue - No Veto Signal