napres Entries 2611 Mean -0.05233 RMS 0.2

Momentum Resolution (GeV/c)

-1 -0.8 -0.6 -0.4 -0.2 -0 0.2 0.4 0.6 0.8 1 0 20 40 60 80 100 120 140 160

Proton Momentum Resolution