htemp Entries 320 Mean -0.03758 RMS 0.0891

P_diff (GeV)

-0.3 -0.2 -0.1 0 0.1 0.2 0.3 0

5

10

15

20

25

30 P_diff - Run 3365 - No cell restrictions