tofdiff Entries 2608 Mean -0.1462 RMS 0.9698

ToF Resolution (ns)- No corrections

-4 -3 -2 -1 0 1 2 3 4 0 10 20 30 40 50 60 70 80 90 Time of Flight Resolution