Entries 11433

Invariant Mass W (GeV)

0.8 1 1.2 1.4 1.6 0 50 100 150 200 250 300 350 400 450 Invariant Mass W - BigBite Spectrometer - Hydrogen Target - 2.079GeV Beam at 2uA