Whist_full Entries 17072 Mean 0.9456 RMS 0.02164

W (GeV)

0.7 0.8 0.9 1 1.1 1.2 1.3 0 500 1000

1500

2000

2500

3000

Invariant Mass (W=0.94+/-0.1 GeV, Pmiss_par < 0.2GeV)