Whist_full Entries 1041067 Mean 0.9735 RMS 0.09141

W (GeV)

0.7 0.8 0.9 1 1.1 1.2 1.3 0 5000

10000

15000

20000

25000

30000

35000

40000

45000

Invariant Mass (W=0.94+/-0.2 GeV, Pmiss_par < 0.2GeV)