pmisspar_full Entries 1041067 Mean -0.007414 RMS 0.1407

p_miss_par (GeV)

-0.8 -0.6 -0.4 -0.2 -0 0.2 0.4 0.6 0.8 0 10000

20000

30000

40000

50000

60000

70000

80000

90000

Pmiss_par (W=0.94+/-0.2 GeV, Pmiss_par < 0.2GeV)