pmissperp_full Entries 1041067 Mean 0.05336 RMS 0.03022

p_miss_perp (GeV)

0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 0.4 0.45 0.5 0 20 40

60 80 100 120 310 × Pmiss_perp (W=0.94+/-0.2 GeV, Pmiss_par < 0.2GeV)