pmisspar_full Entries 4535 Mean 0.004508 RMS 0.1526

p_miss_par (GeV)

-0.8 -0.6 -0.4 -0.2 -0 0.2 0.4 0.6 0.8 0 50 100 150 200 250 300 350

Pmiss_par (W=0.94+/-0.2 GeV, Pmiss_par < 0.2GeV)