Left Bar Number

0 5 10 15 20 25 30

Right Bar Number

0

5

10

15

20

25

30 lrcorr Entries 487 Mean x 17.52 Mean y 17.36 RMS x 7.373 RMS y 7.344

Left-Right ADC Correlations