Left Bar Number

0 5 10 15 20 25 30

Right Bar Number

0

5

10

15

20

25

30 lrcorr Entries 4999 Mean x 18.65 Mean y 14.78 RMS x 7.487 RMS y 7.722

Left-Right ADC Correlations