Average Bar Number

0 5 10 15 20 25 30

Shower X (m)

-0.08

-0.06

-0.04

-0.02 0 0.02

0.04

0.06 shndcorr Entries 487 Mean x 17.47 Mean y 0.005 RMS x 7.334 RMS y 7.31e-11

Shower-Bar Correlations