-20 -15 -10 -5 0 5 10 15 20 0 5 10 15 20 25 30 35 Sigma, Chamber 1: Run 1629^{chamber_1}_{Entries 2777}

Mean -0.5838 RMS 4.198

Sigma, Chamber 1: Run 1629

-20 -15 -10 -5 0 5 10 15 20 0

10

20

30

40

50 Sigma, Chamber 2: Run 1629^{chamber_2}_{Entries 2777}

Mean 0.6169 RMS 2.687

Sigma, Chamber 2: Run 1629

-20 -15 -10 -5 0 5 10 15 20 0 5 10 15 20 25 30 35 40 45 Sigma, Chamber 3: Run 1629^{chamber_3}_{Entries 2777}

Mean -0.9323 RMS 3.364

Sigma, Chamber 3: Run 1629