-20 -15 -10 -5 0 5 10 15 20 0

100

200

300

400

500

600 Sigma, Chamber 1: Run 1682-all^{chamber_1}_{Entries 6744}

Mean -0.5266 RMS 3.421

Sigma, Chamber 1: Run 1682-all

-20 -15 -10 -5 0 5 10 15 20 0 100 200 300 400 500 600 700 800 Sigma, Chamber 2: Run 1682-all^{chamber_2}_{Entries 6744}

Mean 0.7283 RMS 3.193

Sigma, Chamber 2: Run 1682-all

-20 -15 -10 -5 0 5 10 15 20 0 200 400

600 800 1000

1200

1400

Sigma, Chamber 3: Run 1682-all^{chamber_3}_{Entries 6744}

Mean -0.2709 RMS 3.425

Sigma, Chamber 3: Run 1682-all