Wire Number

0 20 40 60 80 100 120 140

Counts

20 40 60 80 100 120 140 160 180 Plane u1^{Wires-u1}_{Entries 16483}

Mean 68.34 RMS 37.11

Plane u1

Wire Number

0 20 40 60 80 100 120 140

Counts

90 100 110 120 130 140 150 160 170 180 Plane x1^{Wires-x1}_{Entries 17480}

Mean 71.44 RMS 42.3

Plane x1

Wire Number

0 20 40 60 80 100 120 140

Counts

0 20 40 60 80 100 120 140 160 180 200 Plane v1^{Wires-v1}_{Entries 18287}

Mean 69.76 RMS 36.69

Plane v1

Wire Number

0 20 40 60 80 100 120 140

Counts

20 40 60 80 100 120 140 160 180 Plane u2^{Wires-u2}_{Entries 17370}

Mean 70.83 RMS 36.71

Plane u2

Wire Number

0 20 40 60 80 100 120 140

Counts

80

100

120

140

160

180

Plane x2^{Wires-x2}_{Entries 17854}

Mean 71.69 RMS 42.43

Plane x2

Wire Number

0 20 40 60 80 100 120 140

Counts

20 40 60 80 100 120 140 160 180 200 Plane v2^{Wires-v2}_{Entries 18551}

Mean 71.35 RMS 36.7

Plane v2

Wire Number

0 20 40 60 80 100 120 140 160 180 200

Counts

0 20 40 60 80 100 120 140 160 Plane u3^{Wires-u3}_{Entries 12566}

Mean 100.3 RMS 37.13

Plane u3

Wire Number

0 20 40 60 80 100 120 140 160 180 200

Counts

0 20

40 60 80

100 120 140 Plane x3^{Wires-x3}_{Entries 12328}

Mean 98.46 RMS 38.99

Plane x3

Wire Number

0 20 40 60 80 100 120 140 160 180 200

Counts

0 20 40 60 80 100 120 140

Plane v3^{Wires-v3}_{Entries 12174}

Mean 97.47 RMS 36.1

Plane v3