htemp Entries 4891 Mean -7.053e-06 RMS 0.002253

Coarse Y - Monte Carlo Y (m)

-0.008 -0.006 -0.004 -0.002 0 0.002 0.004 0.006 0.008 0 20 40 60 80 100 120 140 160 B.ctr.y-MC.tr.y