Entries 7405

1000 1200 1400 1600 1800 2000 2200 2400 0

50

100

150

200

250

300

lt[1]

Entries 10869

1000 1200 1400 1600 1800 2000 2200 2400 0

50

100

150

200

250

300

lt[2]

Entries 12854

1000 1200 1400 1600 1800 2000 2200 2400 0

50

100

150

200

250

300

lt[3]

Entries 13933

1000 1200 1400 1600 1800 2000 2200 2400 0

50

100

150

200

250

300

lt[4]

Entries 14370

1000 1200 1400 1600 1800 2000 2200 2400 0

50

100

150

200

250

300

lt[5]

Entries 13502

1000 1200 1400 1600 1800 2000 2200 2400 0

50

100

150

200

250

300

lt[6]

Entries 13779

1000 1200 1400 1600 1800 2000 2200 2400 0

50

100

150

200

250

300

lt[7]

Entries 11621

1000 1200 1400 1600 1800 2000 2200 2400 0

50

100

150

200

250

300

lt[8]

Entries 11014

1000 1200 1400 1600 1800 2000 2200 2400 0

50

100

150

200

250

300

lt[9]

Entries 9955

1000 1200 1400 1600 1800 2000 2200 2400 0

50

100

150

200

250

300

lt[10]

Entries 10446

1000 1200 1400 1600 1800 2000 2200 2400 0

50

100

150

200

250

300

lt[11]

Entries 9510

1000 1200 1400 1600 1800 2000 2200 2400 0

50

100

150

200

250

300

lt[12]

Entries 9500

1000 1200 1400 1600 1800 2000 2200 2400 0

50

100

150

200

250

300

lt[13]

Entries 7223

1000 1200 1400 1600 1800 2000 2200 2400 0

50

100

150

200

250

300

rt[1]

Entries 10921

1000 1200 1400 1600 1800 2000 2200 2400 0

50

100

150

200

250

300

rt[2]

Entries 12716

1000 1200 1400 1600 1800 2000 2200 2400 0

50

100

150

200

250

300

rt[3]

Entries 13825

1000 1200 1400 1600 1800 2000 2200 2400 0

50

100

150

200

250

300

rt[4]

Entries 14527

1000 1200 1400 1600 1800 2000 2200 2400 0

50

100

150

200

250

300

rt[5]

Entries 13430

1000 1200 1400 1600 1800 2000 2200 2400 0

50

100

150

200

250

300

rt[6]

Entries 14029

1000 1200 1400 1600 1800 2000 2200 2400 0

50

100

150

200

250

300

rt[7]

Entries 11793

1000 1200 1400 1600 1800 2000 2200 2400 0

50

100

150

200

250

300

rt[8]

Entries 10833

1000 1200 1400 1600 1800 2000 2200 2400 0

50

100

150

200

250

300

rt[9]

Entries 9686

1000 1200 1400 1600 1800 2000 2200 2400 0

50

100

150

200

250

300

rt[10]

Entries 10345

1000 1200 1400 1600 1800 2000 2200 2400 0

50

100

150

200

250

300

rt[11]

Entries 9601

1000 1200 1400 1600 1800 2000 2200 2400 0

50

100

150

200

250

300

rt[12]

Entries 9452

1000 1200 1400 1600 1800 2000 2200 2400 0

50

100

150

200

250

300

rt[13]

Entries 6966

-400 -300 -200 -100 0 100 200 300 0

50

100

150

200

250

300 1

Entries 10465

-400 -300 -200 -100 0 100 200 300 0

50

100

150

200

250

300 2

Entries 12382

-400 -300 -200 -100 0 100 200 300 0

50

100

150

200

250

300

3

Entries 13519

-400 -300 -200 -100 0 100 200 300 0

50

100

150

200

250

300 4

Entries 14008

-400 -300 -200 -100 0 100 200 300 0

50

100

150

200

250

300

5

Entries 13024

-400 -300 -200 -100 0 100 200 300 0

50

100

150

200

250

300

6

Entries 13421

-400 -300 -200 -100 0 100 200 300 0

50

100

150

200

250

300 7

Entries 11358

-400 -300 -200 -100 0 100 200 300 0

50

100

150

200

250

300

8

Entries 10515

-400 -300 -200 -100 0 100 200 300 0

50

100

150

200

250

300

9

Entries 9449

-400 -300 -200 -100 0 100 200 300 0

50

100

150

200

250

300

10

Entries 10026

-400 -300 -200 -100 0 100 200 300 0

50

100

150

200

250

300 11

Entries 9214

-400 -300 -200 -100 0 100 200 300 0

50

100

150

200

250

300 12

Entries 9214

-400 -300 -200 -100 0 100 200 300 0

50

100

150

200

250

300

13

1000 1200 1400 1600 1800 2000 2200 2400

1000

1200

1400

1600

1800

2000

2200

2400

Entries 6966

1

1000 1200 1400 1600 1800 2000 2200 2400

1000

1200

1400

1600

1800

2000

2200

2400

Entries 10465

2

1000 1200 1400 1600 1800 2000 2200 2400

1000

1200

1400

1600

1800

2000

2200

2400

Entries 12382

3

1000 1200 1400 1600 1800 2000 2200 2400

1000

1200

1400

1600

1800

2000

2200

2400

Entries 13519

4

1000 1200 1400 1600 1800 2000 2200 2400

1000

1200

1400

1600

1800

2000

2200

2400

Entries 14008

5

1000 1200 1400 1600 1800 2000 2200 2400

1000

1200

1400

1600

1800

2000

2200

2400

Entries 13024

6

1000 1200 1400 1600 1800 2000 2200 2400

1000

1200

1400

1600

1800

2000

2200

2400

Entries 13421

7

1000 1200 1400 1600 1800 2000 2200 2400

1000

1200

1400

1600

1800

2000

2200

2400

Entries 11358

8

1000 1200 1400 1600 1800 2000 2200 2400

1000

1200

1400

1600

1800

2000

2200

2400

Entries 10515

9

1000 1200 1400 1600 1800 2000 2200 2400

1000

1200

1400

1600

1800

2000

2200

2400

Entries 9449

10

1000 1200 1400 1600 1800 2000 2200 2400

1000

1200

1400

1600

1800

2000

2200

2400

Entries 10026

11

1000 1200 1400 1600 1800 2000 2200 2400

1000

1200

1400

1600

1800

2000

2200

2400

Entries 9214

12

1000 1200 1400 1600 1800 2000 2200 2400

1000

1200

1400

1600

1800

2000

2200

2400

Entries 9214

13

1000 1200 1400 1600 1800 2000 2200 2400 0 200 400 600 800 1000

1200

1400

1600

1800

2000

Entries 7405

l1

1000 1200 1400 1600 1800 2000 2200 2400 0 200 400 600 800 1000

1200

1400

1600

1800

2000

Entries 10868

l2

1000 1200 1400 1600 1800 2000 2200 2400 0 200 400 600 800 1000

1200

1400

1600

1800

2000

Entries 12854

l3

1000 1200 1400 1600 1800 2000 2200 2400 0 200 400 600 800 1000

1200

1400

1600

1800

2000

Entries 13933

l4

1000 1200 1400 1600 1800 2000 2200 2400 0 200 400 600 800 1000

1200

1400

1600

1800

2000

Entries 14370

l5

1000 1200 1400 1600 1800 2000 2200 2400 0 200 400 600 800 1000

1200

1400

1600

1800

2000

Entries 13502

l6

1000 1200 1400 1600 1800 2000 2200 2400 0 200 400 600 800 1000

1200

1400

1600

1800

2000

Entries 13779

l7

1000 1200 1400 1600 1800 2000 2200 2400 0 200 400 600 800 1000

1200

1400

1600

1800

2000

Entries 11621

l8

1000 1200 1400 1600 1800 2000 2200 2400 0 200 400 600 800 1000

1200

1400

1600

1800

2000

Entries 11014

l9

1000 1200 1400 1600 1800 2000 2200 2400 0 200 400 600 800 1000

1200

1400

1600

1800

2000

Entries 9954

l10

1000 1200 1400 1600 1800 2000 2200 2400 0 200 400 600 800 1000

1200

1400

1600

1800

2000

Entries 10446

l11

1000 1200 1400 1600 1800 2000 2200 2400 0 200 400 600 800 1000

1200

1400

1600

1800

2000

Entries 9510

l12

1000 1200 1400 1600 1800 2000 2200 2400 0 200 400 600 800 1000

1200

1400

1600

1800

2000

Entries 9500

l13

1000 1200 1400 1600 1800 2000 2200 2400 0 200 400 600 800 1000

1200

1400

1600

1800

2000

Entries 7223

r1

1000 1200 1400 1600 1800 2000 2200 2400 0 200 400 600 800 1000

1200

1400

1600

1800

2000

Entries 10920

r2

1000 1200 1400 1600 1800 2000 2200 2400 0 200 400 600 800 1000

1200

1400

1600

1800

2000

Entries 12716

r3

1000 1200 1400 1600 1800 2000 2200 2400 0 200 400 600 800 1000

1200

1400

1600

1800

2000

Entries 13825

r4

1000 1200 1400 1600 1800 2000 2200 2400 0 200 400 600 800 1000

1200

1400

1600

1800

2000

Entries 14527

r5

1000 1200 1400 1600 1800 2000 2200 2400 0 200 400 600 800 1000

1200

1400

1600

1800

2000

Entries 13430

r6

1000 1200 1400 1600 1800 2000 2200 2400 0 200 400 600 800 1000

1200

1400

1600

1800

2000

Entries 14029

r7

1000 1200 1400 1600 1800 2000 2200 2400 0 200 400 600 800 1000

1200

1400

1600

1800

2000

Entries 11793

r8

1000 1200 1400 1600 1800 2000 2200 2400 0 200 400 600 800 1000

1200

1400

1600

1800

2000

Entries 10832

r9

1000 1200 1400 1600 1800 2000 2200 2400 0 200 400 600 800 1000

1200

1400

1600

1800

2000

Entries 9685

r10

1000 1200 1400 1600 1800 2000 2200 2400 0 200 400 600 800 1000

1200

1400

1600

1800

2000

Entries 10345

r11

1000 1200 1400 1600 1800 2000 2200 2400 0 200 400 600 800 1000

1200

1400

1600

1800

2000

Entries 9601

r12

1000 1200 1400 1600 1800 2000 2200 2400 0 200 400 600 800 1000

1200

1400

1600

1800

2000

Entries 9452

r13