htemp Entries 1000 Mean -0.001971 RMS 0.2125

Coarse Track - Real Track X (z=0.0m) (m)

-0.4 -0.2 0 0.2 0.4 0

5

10

15

20

25 B.ctr.x-MC.tr.x