wires-u1 Entries 1000 Mean 1 RMS 0

Cut result

-0.2 0 0.2 0.4 0.6 0.8 1 1.2 1.4

Hit Counts

0

200

400

600

800

1000

Shower cust for plane u1^{wires-u2}_{Entries 1000}

Mean 1 RMS 0

Cut result

-0.2 0 0.2 0.4 0.6 0.8 1 1.2 1.4

Hit Counts

0

200

400

600

800

1000 wires-u2 Entries 1000

Shower cust for plane u2^{wires-u3}_{Entries 1000}

Mean 1 RMS 0

Cut result

-0.2 0 0.2 0.4 0.6 0.8 1 1.2 1.4

Hit Counts

0

200

400

600

800

1000 wires-u3 Entries 1000

Shower cust for plane u3^{wires-u4}_{Entries 1000}

Mean 1 RMS 0

Cut result

-0.2 0 0.2 0.4 0.6 0.8 1 1.2 1.4

Hit Counts

0

200

400

600

800

1000 wires-u4 Entries 1000

Shower cust for plane u4

wires-u5 Entries 1000 Mean 1 RMS 0

Cut result

-0.2 0 0.2 0.4 0.6 0.8 1 1.2 1.4

Hit Counts

0

200

400

600

800

1000

Shower cust for plane u5^{wires-x1}_{Entries 1000}

Mean 1 RMS 0

Cut result

-0.2 0 0.2 0.4 0.6 0.8 1 1.2 1.4

Hit Counts

0

200

400

600

800

1000 wires-x1 Entries 1000

Shower cust for plane x1^{wires-x2}_{Entries 1000}

Mean 1 RMS 0

Cut result

-0.2 0 0.2 0.4 0.6 0.8 1 1.2 1.4

Hit Counts

0

200

400

600

800

1000 wires-x2 Entries 1000

Shower cust for plane x2^{wires-x3}_{Entries 1000}

Mean 1 RMS 0

Cut result

-0.2 0 0.2 0.4 0.6 0.8 1 1.2 1.4

Hit Counts

0

200

400

600

800

1000 wires-x3 Entries 1000

Shower cust for plane x3

wires-x4 Entries 1000 Mean 1 RMS 0

Cut result

-0.2 0 0.2 0.4 0.6 0.8 1 1.2 1.4

Hit Counts

0

200

400

600

800

1000

Shower cust for plane x4^{wires-x5}_{Entries 1000}

Mean 1 RMS 0

Cut result

-0.2 0 0.2 0.4 0.6 0.8 1 1.2 1.4

Hit Counts

0

200

400

600

800

1000 wires-x5 Entries 1000

Shower cust for plane x5^{wires-v1}_{Entries 1000}

Mean 1 RMS 0

Cut result

-0.2 0 0.2 0.4 0.6 0.8 1 1.2 1.4

Hit Counts

0

200

400

600

800

1000 wires-v1 Entries 1000

Shower cust for plane v1^{wires-v2}_{Entries 1000}

Mean 1 RMS 0

Cut result

-0.2 0 0.2 0.4 0.6 0.8 1 1.2 1.4

Hit Counts

0

200

400

600

800

1000 wires-v2 Entries 1000

Shower cust for plane v2

wires-v3 Entries 1000 Mean 1 RMS 0

Cut result

-0.2 0 0.2 0.4 0.6 0.8 1 1.2 1.4

Hit Counts

0

200

400

600

800

1000

Shower cust for plane v3^{wires-v4}_{Entries 1000}

Mean 1 RMS 0

Cut result

-0.2 0 0.2 0.4 0.6 0.8 1 1.2 1.4

Hit Counts

0

200

400

600

800

1000 wires-v4 Entries 1000

Shower cust for plane v4^{wires-v5}_{Entries 1000}

Mean 1 RMS 0

Cut result

-0.2 0 0.2 0.4 0.6 0.8 1 1.2 1.4

Hit Counts

0

200

400

600

800

1000 wires-v5 Entries 1000

Shower cust for plane v5