xhist-plane-u1 Entries 1000 Mean 0.001439 RMS 0.003009

Difference from cut center (Wirepos - Area Center) (m)

-0.05 -0.04 -0.03 -0.02 -0.01 0 0.01 0.02 0.03 0.04 0.05

Counts

0

20

40

60

80

100

120 Run 1462 - Plane u1^{xhist-plane-u2}_{Entries 1000}

Mean 0.001296 RMS 0.003103

Difference from cut center (Wirepos - Area Center) (m)

-0.05 -0.04 -0.03 -0.02 -0.01 0 0.01 0.02 0.03 0.04 0.05

Counts

0

20

40

60

80

100 xhist-plane-u2 Entries 1000

Run 1462 - Plane u2^{xhist-plane-u3}_{Entries 1000}

Mean 0.0009175 RMS 0.002996

Difference from cut center (Wirepos - Area Center) (m)

-0.05 -0.04 -0.03 -0.02 -0.01 0 0.01 0.02 0.03 0.04 0.05

Counts

0

20

40

60

80

100

120 xhist-plane-u3 Entries 1000

Run 1462 - Plane u3^{xhist-plane-u4}_{Entries 1000}

Mean 0.001691 RMS 0.002881

Difference from cut center (Wirepos - Area Center) (m)

-0.05 -0.04 -0.03 -0.02 -0.01 0 0.01 0.02 0.03 0.04 0.05

Counts

0

20

40

60

80

100 xhist-plane-u4 Entries 1000

Run 1462 - Plane u4

xhist-plane-u5 Entries 1000 Mean 0.001851 RMS 0.002953

Difference from cut center (Wirepos - Area Center) (m)

-0.05 -0.04 -0.03 -0.02 -0.01 0 0.01 0.02 0.03 0.04 0.05

Counts

0

20

40

60

80

100

Run 1462 - Plane u5^{xhist-plane-x1}_{Entries 1000}

Mean 0.003549 RMS 0.002869

Difference from cut center (Wirepos - Area Center) (m)

-0.05 -0.04 -0.03 -0.02 -0.01 0 0.01 0.02 0.03 0.04 0.05

Counts

0

20

40

60

80

100

120 xhist-plane-x1 Entries 1000

Run 1462 - Plane x1^{xhist-plane-x2}_{Entries 1000}

Mean 0.00344 RMS 0.002962

Difference from cut center (Wirepos - Area Center) (m)

-0.05 -0.04 -0.03 -0.02 -0.01 0 0.01 0.02 0.03 0.04 0.05

Counts

0

20

40

60

80

100 xhist-plane-x2 Entries 1000

Run 1462 - Plane x2^{xhist-plane-x3}_{Entries 1000}

Mean 0.002655 RMS 0.002836

Difference from cut center (Wirepos - Area Center) (m)

-0.05 -0.04 -0.03 -0.02 -0.01 0 0.01 0.02 0.03 0.04 0.05

Counts

0

20

40

60

80

100 xhist-plane-x3 Entries 1000

Run 1462 - Plane x3

xhist-plane-x4 Entries 1000 Mean 0.00138 RMS 0.002885

Difference from cut center (Wirepos - Area Center) (m)

-0.05 -0.04 -0.03 -0.02 -0.01 0 0.01 0.02 0.03 0.04 0.05

Counts

0

20

40

60

80

100

Run 1462 - Plane x4^{xhist-plane-x5}_{Entries 1000}

Mean 0.001408 RMS 0.002858

Difference from cut center (Wirepos - Area Center) (m)

-0.05 -0.04 -0.03 -0.02 -0.01 0 0.01 0.02 0.03 0.04 0.05

Counts

0

20

40

60

80

100

120 xhist-plane-x5 Entries 1000

Run 1462 - Plane x5^{xhist-plane-v1}_{Entries 1000}

Mean 0.00457 RMS 0.003024

Difference from cut center (Wirepos - Area Center) (m)

-0.05 -0.04 -0.03 -0.02 -0.01 0 0.01 0.02 0.03 0.04 0.05

Counts

0

20

40

60

80

100 xhist-plane-v1 Entries 1000

Run 1462 - Plane v1^{xhist-plane-v2}_{Entries 1000}

Mean 0.00473 RMS 0.00303

Difference from cut center (Wirepos - Area Center) (m)

-0.05 -0.04 -0.03 -0.02 -0.01 0 0.01 0.02 0.03 0.04 0.05

Counts

0

20

40

60

80

100 xhist-plane-v2 Entries 1000

Run 1462 - Plane v2

xhist-plane-v3 Entries 1000 Mean 0.003206 RMS 0.002919

Difference from cut center (Wirepos - Area Center) (m)

-0.05 -0.04 -0.03 -0.02 -0.01 0 0.01 0.02 0.03 0.04 0.05

Counts

0

20

40

60

80

100

120 Run 1462 - Plane v3^{xhist-plane-v4}_{Entries 1000}

Mean 0.0005258 RMS 0.002825

Difference from cut center (Wirepos - Area Center) (m)

-0.05 -0.04 -0.03 -0.02 -0.01 0 0.01 0.02 0.03 0.04 0.05

Counts

0

20

40

60

80

100

120 xhist-plane-v4 Entries 1000

Run 1462 - Plane v4^{xhist-plane-v5}_{Entries 1000}

Mean 0.0004993 RMS 0.00304

Difference from cut center (Wirepos - Area Center) (m)

-0.05 -0.04 -0.03 -0.02 -0.01 0 0.01 0.02 0.03 0.04 0.05

Counts

0

20

40

60

80

100 xhist-plane-v5 Entries 1000

Run 1462 - Plane v5