htemp Entries 21052 Mean -0.1943 RMS 0.1592

P_Diff (GeV)

-0.6 -0.4 -0.2 -0 0.2 0 200 400 600 800 1000

1200

1400

P_Diff - Run 4425 - H2 at 2uA - Preshower Cut, Vertex Cut, Track X Cut