for Neutron Detector clusters WITHOUT a Veto hit β Reconstructed 1/

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 0 5000

10000

15000

20000

Neutron inverse beta distribution Signal Region

Accidental Coincidences for Neutron Detector clusters with a Veto hit β Reconstructed 1/

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 0

20000

40000

60000

Charged inverse beta distribution