h Entries 92992 Mean 0.8746 RMS 0.6885

Inverse Beta cutting on only SANE events in electron arm

-1 -0.5 0 0.5 1 1.5 2 100 200 300 400 500 600 700 800 h (na.tr.time[0]-(Btof-Rfdt)+0.05*D.ctimeL1A[0]-tshift)/Ppathl0*.3 h

Background region

h Entries 92992 Mean 0.8746 RMS 0.6885

Inverse Beta cutting on only SANE events in electron arm

-1 -0.5 0 0.5 1 1.5 2 0 1000

2000

3000

4000

5000

6000

7000 h (na.tr.time[0]-(Btof-Rfdt)+0.05*D.ctimeL1A[0]-tshift)/Ppathl0*.3