SCpp0 Entries 1081 Mean 0.04974 RMS 0.0502

Pperp (GeV/c)

0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 0.4 0.45 0.5 1

10

210

310

Charged events, 0.80<W<1.15 GeV, -.25<Ppar-q<+.25 GeV/c SCpp1 Entries 902 Mean 0.08525 RMS 0.06174

Pperp (GeV/c)

0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 0.4 0.45 0.5 0

100

200

300

400

500 SCpp1 Charged events, 0.80<W<1.15 GeV, -.75<Ppar-q<-.25 GeV/c

NtoPpp0 Entries 848 Mean 0.3414 RMS 0.1142

Pperp (GeV/c)

0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 0.4 0.45 0.5 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 Neutral to Charged ratio, 0.80<W<1.15 GeV, -.25<Ppar-q<+.25 GeV/c NtoPpp1 Entries 888 Mean 0.2334 RMS 0.1085

Pperp (GeV/c)

0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 0.4 0.45 0.5 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 NtoPpp1 Neutral to Charged ratio, 0.80<W<1.15 GeV, -.75<Ppar-q<-.25 GeV/c