SCpp0 Entries 652 Mean 0.08781 RMS 0.05852

Pperp (GeV/c)

0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 0.4 0.45 0.5 0

200

400

600

800

1000

Charged events, 0.80<W<1.15 GeV, -.25<Ppar-q<+.25 GeV/c SCpp1 Entries 555 Mean 0.1036 RMS 0.0684

Pperp (GeV/c)

0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 0.4 0.45 0.5 0

50

100

150

200

250 SCpp1 Charged events, 0.80<W<1.15 GeV, -.75<Ppar-q<-.25 GeV/c

NtoPpp0 Entries 554 Mean 0.3392 RMS 0.1103

Pperp (GeV/c)

0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 0.4 0.45 0.5 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 Neutral to Charged ratio, 0.80<W<1.15 GeV, -.25<Ppar-q<+.25 GeV/c NtoPpp1 Entries 564 Mean 0.2292 RMS 0.1182

Pperp (GeV/c)

0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 0.4 0.45 0.5 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 NtoPpp1 Neutral to Charged ratio, 0.80<W<1.15 GeV, -.75<Ppar-q<-.25 GeV/c