hwn Entries 6793 Mean 1.008 RMS 0.1066 / ndf

2χ 122.8 / 49 p0 11.5±

420.6 p1 0.0004 ± 0.9388 p2 0.00039 ± 0.01754 p3 8.3±

-1233 p4 11.8±

2329 p5 13.1±

272.9 p6 12.6±

-2608 p7 9.4±

1303

W (GeV)

0.6 0.7 0.8 0.9 1 1.1 1.2 0

100

200

300

400

500

± ±

sqrt(EK.W2) {B.ts.ps.e>450&&B.tr.p[0]>0&&abs(B.tr.x[0])<.4&&abs(B.tr.vz[0])<.17&&sqrt(EK.W2)>0.6&&sqrt(EK.W2)<1.2&&Ndata.D.bit3>0&&B.tr.xp[0]>-.3&&B.tr.xp[0]<.1} hwo Entries 6459 Mean 1.009 RMS 0.1076

± ±